18.00000     H: atmospheric scale height (km) (used as a reference only)
0.010       Typical pseudo-altitude (m) for 1st layer (z=H*log(sigma))
0.025
0.040
0.060
0.090
0.1200
0.1500
0.1800
0.2200
0.2800
0.3400
0.4100
0.5000
0.70000
0.90000
1.20000
1.50000
1.80000
2.10000
2.50000
3.00000
3.60000
4.30000
5.00000
6.50000
8.00000
9.50000
11.0000
13.0000
16.0000
19.0000
22.0000
25.0000
28.0000
32.0000
36.0000
40.0000
45.0000
50.0000
55.0000
60.0000
66.0000
72.0000
80.0000
95.0000
115.000
140.000
