# Planetary radius (m) : real (default=1187000)
radius = 1187000

# Pluto year length (in Pluto days)
year_day = 14178.3037109375

# day length (s) : real (default 551854.0625)
daysec = 551854.0625

#periastron (in AU)
periastron = 29.65831
#apoastron (in AU)
apoastron = 49.3050467

# periastron date (in sols since N. spring)
periastron_day = 87.3600006103516

# obliquity (in degrees)
obliquity = 119.6

# Gravity : real (default=0.61718899)
g = 0.61718899

# Planetary rotation rate : real (default=1.138559e-05)
omega = 1.138559e-05

# kappa=Rd/cpp : real (default=0.2852999866)
kappa = 0.2852999866

# Heat capacity at constant pressure : real (default=1004.70885)
cpp = 1040.0

# Reference pressure : real (default=1.1)
preff = 1.1

# Reference "pa" for hybrid vertical coordinate (Pa)
pa = 0.2

# Atmospheric Scale height (m) # should match the one in z2sig.def !!
scale_height=18000.
