# gases
4
N2_
CO2
CH4
H2O
0.999611900E+00
0.375999962E-03
0.174999983E-05
-1

# First line is number of gases
# Followed by gas names (always 3 characters)
# and then mixing ratios.
# mixing ratio -1 means the gas is variable.
