17.0
3.24408086057
6.17180814028
10.877106139
17.4731260559
25.8561008821
35.7739296878
46.9006189997
58.894862645
71.4376709403
84.2520594783
97.1101205779
109.832385725
122.283120374
134.363931004
146.007089889
157.169320305
167.826371667
177.968475385
187.596645877
196.719732904
