# gases
5
H2_
He_
CH4
C2H2
C2H6
0.863
0.134
0.0018
1.e-7
1.e-5
# First line is number of gases
# Followed by gas names (always 3 characters)
# and then molar mixing ratios.
# mixing ratio -1 means the gas is variable.

