# Profile (Reference CH4 vertical profile (mol/mol) : Surface ---> Top)
0.0565
0.0567
0.0568
0.0572
0.0572
0.0575
0.0544
0.0476
0.0393
0.0319
0.0267
0.0232
0.0200
0.0181
0.0168
0.0159
0.0152
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
0.0148
