diagfi.nc
tsurf
ps

2    ! number of local time to be used
2      ! list of local times
14


-----------------------------------------------------------------------
ABOVE is the list of inputs to be fed to "localtime.e" if you don t want
to reply directly to the program:

1) complete name of file to be read
2) List of X variables to be kept (X lines) or 'all'
3) blank line at the end
5) number of local time to be used ?
6) list of selected local time (0<t<24)

USE :
localtime.e < localtime.def


