diagfi.nc
ps
n_co

16
-168.75
-146.25
-123.75
-101.25
-78.25
-56.25
-33.75
-11.25
11.25
33.75
56.25
78.25
101.25
123.75
146.25
168.75
13
90
75
60
45
30
15
0
-15
-30
-45
-60
-75
-90
