diagfi.nc
~/datadir
5.e-7
ext
yes
dust,dustq,reffdust,2500,optprop_dustvis_TM_n50.dat
h2o_ice,h2o_ice,5.e-6,920,optprop_icevis_n30.dat
stormdust,rdsdustq,reffstormdust,2500,optprop_dustvis_TM_n50.dat
topdust,topdustq,refftopdust,2500,optprop_dustvis_TM_n50.dat


##----------------------------------------------------------
1) Name of the GCM input file
2) Directory where the optical properties files are
3) The wavelength at which the output opacities are calibrated (in meters)
4) Opacity type : extinction (ext) or absorption (abs)
5) Computation of the column-integrated optical depth? (yes/no)

6) aerosol_name,aerosol_mmr(variable name),aerosol_reff(variable name or single value in m),aerosol_rho(value in kg/m3),optpropfile_name
7) aerosol_name,aerosol_mmr(variable name),aerosol_reff(variable name or single value in m),aerosol_rho(value in kg/m3),optpropfile_name
...
N) aerosol_name,aerosol_mmr(variable name),aerosol_reff(variable name or single value in m),aerosol_rho(value in kg/m3),optpropfile_name

##----------------------------------------------------------
USUAL GCM OPTPROPFILES :
- for water ice : "optprop_icevis_n30.dat" for visible (wvl<=5.e-6) ; "optprop_iceir_n30.dat" for infrared (wvl>5.e-6)
- for dust (any type) : "optprop_dustvis_TM_n50.dat" for visible (wvl<=5.e-6) ; "optprop_dustir_n50.dat" for infrared (wvl>5.e-6)
