## planet-specific constants
#Reference surface pressure (Pa)
preff=300000.
# Reference pressure at which hybrid coord. become purely pressure
# (default pa=preff/2.)
# Gravity
##g=26.
g=8.
# Molar mass of the atmosphere
molmass = 2.3
# kappa = R/Cp et Cp     (default 2./7.) 
# (default cpp : 8.3145/molmass/kappa*1000.)
# Radius of the planet
###radius = 69.86e6
##radius = 12.e6
radius = 26e6
# Length of a standard day (s)
#daysec=35726.
daysec= 35700.0
# Length of a solar day, in standard days
# (default: daylen = 1. )
# Number of days (standard) per year:
# year_day = 10476
year_day=10484
# Omega
# default: omeg= 2.*pi/daysec*(1./daylen+1./year_day)

### intrinsic heat flux ###
#ihf=6.
ihf=30.


#CALL getin('preff', preff)
#CALL getin('pa', pa)
#CALL getin('g',g)
#CALL getin('molmass',molmass)
#CALL getin('kappa',kappa)
#CALL getin('cpp',cpp)
#CALL getin('radius',rad)
#CALL getin('daysec',daysec)
#CALL getin('daylen',daylen)
#CALL getin('year_day',year_day)
#CALL getin('omeg',omeg)

