diagfi_P.nc
0.0
1
temp
-20 25 100 35 2
-20 25 100 35 14
20 -25 100 35 12
20 25 50 40 16



!! in the example above we extract the temperature ("temp" variable) at
!! lon=-20 lat=25 alt=100  Ls=35  LT=2
!! lon=-20 lat=25 alt=100  Ls=35  LT=14
!! lon=20 lat=-25 alt=100  Ls=35  LT=12
!! lon=20 lat=25 alt=50  Ls=40  LT=16
!! from a file which "starts" (has time=0.0) at Ls=30 (so we have to
!! add an offset of 193 sols).
!! Note that since the input file vertical coordinate is pressure,
!! specifying alt=100 implies that we seek data at 100Pa.
