10.00000     H: atmospheric scale height (km) (used as a reference only)
  2.0736000E-03  2.0736000E-03
  1.5735000E-02  1.3661400E-02
  6.0015101E-02  4.4280101E-02
  0.1633440      0.1033289    
  0.3635800      0.2002360    
  0.7080070      0.3444270    
   1.193340      0.4853330    
   1.738673      0.5453330    
   2.311467      0.5727936    
   2.913104      0.6016369    
   3.545036      0.6319327    
   4.208790      0.6637540    
   4.905968      0.6971779    
   5.638253      0.7322845    
   6.407412      0.7691593    
   7.215303      0.8078909    
   8.063875      0.8485727    
   8.955178      0.8913031    
   9.891363      0.9361849    
   10.87469      0.9833269    
   11.90753       1.032844    
   12.99239       1.084852    
   14.13187       1.139481    
   15.32873       1.196860    
   16.58586       1.257130    
   17.90629       1.320433    
   19.29321       1.386923    
   20.74998       1.456762    
   22.28009       1.530119    
   23.88726       1.607170    
   25.57536       1.688099    
   27.34847       1.773104    
   29.21086       1.862391    
   31.16703       1.956171    
   33.22170       2.054676    
   35.37984       2.158138    
   37.64666       2.266815    
   40.02762       2.380962    
   42.52848       2.500858    
   45.15526       2.626785    
   47.91433       2.759064    
   50.81232       2.897995    
   53.90257       3.090248    
   57.32509       3.422523    
   61.13848       3.813385    
   65.41566       4.277184    
   70.24855       4.832886    
   75.75449       5.505936    
   82.08560       6.331116    
   89.08560       7.000000    
   96.08560       7.000000    
   103.0856       7.000000    
   110.0856       7.000000    
   117.0856       7.000000    
   124.0856       7.000000    
   131.0856       7.000000    
   138.0856       7.000000    
   145.0856       7.000000    
   152.0856       7.000000    
   159.0856       7.000000    
   166.0856       7.000000    
   173.0856       7.000000    
   180.0856       7.000000    
   187.0856       7.000000    
   194.0856       7.000000    
   201.0856       7.000000    
   208.0856       7.000000    
   215.0856       7.000000    
   222.0856       7.000000    
   229.0856       7.000000    
   236.0856       7.000000    
   243.0856       7.000000    
   250.0856       7.000000    
