50.000
12.5
25.0
37.5
50.0
62.5
75.0
87.5
100.0
112.5
125.0
137.5
150.0
162.5
175.0
187.5
200.0
212.5
225.0
237.5
250.0
262.5
275.0
287.5
300.0
312.5
325.0
337.5
350.0
362.5
375.0
387.5
400.0
412.5
425.0
437.5
450.0
462.5
475.0
487.5
500.0
512.5
525.0
537.5
550.0
562.5
575.0
587.5
600.0
612.5
625.0
637.5
650.0
662.5
675.0
687.5
700.0
712.5
725.0
737.5
750.0
762.5
775.0
787.5
800.0
