diagfi_S.nc
0.0
2
temp
100 25 10 0
0
500
1000
1500
2000


!! in the example above we extract a temperature ("temp" variable) profile at
!! lon=100 lat=25 Ls=10 and LT=0
!! at altitudes 0, 500, 1000, 1500 and 2000 m (above surface, since input file
!! is with an "above local surface altitude" vertical coordinate)
