diagfi.nc
tsurf
ps
temp

morning
90
0

-----------------------------------------------------------------------
ABOVE is the list of inputs to be fed to "solzenangle.e" if you don t want
to reply directly to the program:

1) complete name of file to be read
2) List of X variables to be kept (X lines) or 'all'
3) blank line at the end
4) planet side wrt to noon (morning or evening)
5) solar zenith angle (within [0;180[ deg)
0deg = zenith ; 90deg = terminator at the surface ; >90deg = terminator in altitude
6) starttimeoffset :
    - for a diagfi/concat : sol value at the beginning of the run, wrt Ls=0
    - for a stats : sol value at the middle of the run, wrt Ls=0

USE :
solzenangle.e < solzenangle.def


