diagfi.nc
0
5.e-7
~/datadir




##----------------------------------------------------------
1) Name of the GCM input file
2) Value of the water ice effective radius (in meters)
  (if 0, reffwice is read in the input file ;
   usually between 3.e-6m and 5.e-6m )
3) The wavelength at which the output opacities are calibrated (in meters)
4) Directory where the optical properties files are

