50.000
1.0
3.0
8.0
15.0
25.0
35.0
47.0
59.0
71.0
83.0
95.0
107.0
119.0
131.0
143.0
155.0
167.0
179.0
191.0
203.0
215.0
227.0
239.0
251.0
263.0
275.0
287.0
299.0
311.0
323.0
335.0
347.0
359.0
371.0
383.0
395.0
407.0
419.0
431.0
443.0
455.0
467.0
479.0
491.0
503.0
515.0
527.0
539.0
551.0
563.0
575.0
587.0
599.0
611.0
623.0
635.0
647.0
659.0
671.0
683.0
695.0
707.0
719.0
731.0
