10.00000     H: atmospheric scale height (km) (used as a reference only)
0.0020736
0.015735
0.0600151
0.163344
0.36358
0.708007
1.25334
2.06571
3.2
4.7
6.6
8.9
11.6
14.7
18.2
22.1
26.4
31.1
36.2
41.7
47.6
53.9
60.55
67.5
74.5
81.5
88.5
95.5
102.5
109.5
116.5
123.5
130.5
137.5
144.5
151.5
158.5
165.5
172.5
179.5
186.5
193.5
200.5
207.5
214.5
221.5
228.5
235.5
242.5
249.5
