## Orbit / general options
## ~~~~~~~~~~~~~~~~~~~~~~~
# Run with or without tracer transport ?
tracer    = .false.
# Diurnal cycle ?  if diurnal=false, diurnally averaged solar heating
diurnal   = .false. #.true.
# Seasonal cycle ? if season=false, Ls stays constant, to value set in "start"
season    = .true. 
# Tidally resonant orbit ? must have diurnal=false, correct rotation rate in newstart
tlocked   = .false.
# Tidal resonance ratio ? ratio T_orbit to T_rotation
nres      = 1
# Write some more output on the screen ?
lwrite    = .false.
# Save statistics in file "stats.nc" ?
callstats = .false.
# Test energy conservation of model physics ?
enertest  = .false.
# Check to see if cpp, mugaz values used match gas mixture defined in gases.def (recommended) ?
check_cpp_match=.false. 

## Directory where external input files are
## ~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~
#datadir     = /san/home/spiga/DATAGENERIC
#datadir      = /san/home/spiga/COMMON/DATAGENERIC/
datadir     = /home/spiga/datagcm

## Radiative transfer options
## ~~~~~~~~~~~~~~~~~~~~~~~~~~
# call radiative transfer?
callrad    = .true.
# the rad. transfer is computed every "iradia" physical timestep
iradia     = 160
# call multilayer correlated-k radiative transfer ?
corrk      = .true.
# Include continuum absorption in radiative transfer (note CO2 is treated separately) ?
continuum  = .true.
# folder in which correlated-k data is stored ?
corrkdir   = CH4_C2H6_C2H2_Profils
corrkdir   = CH4_C2H6_C2H2_T_70-400K
# call visible gaseous absorption in radiative transfer ?
callgasvis = .true.
# Include Rayleigh scattering in the visible ?
rayleigh   = .true.
# Uniform absorption coefficient in radiative transfer?
graybody     = .false.
# Characteristic planetary equilibrium (black body) temperature
# This is used only in the aerosol radiative transfer setup. (see aerave.F)
tplanet    = 215.
# Output spectral OLR in 1D/3D?
specOLR    = .false.
# Output global radiative balance in file 'rad_bal.out' - slow for 1D!!
meanOLR    = .false.
# Variable gas species: Radiatively active ?
varactive  = .false.
# Variable gas species: Fixed vertical distribution ?
#   (not to be used in time integration mode)
varfixed   = .false.
# Variable gas species: Saturation percentage value at ground ?
satval     = 0.0
# Force specific heat capacity and molecular mass values
force_cpp      = .false.
# Specific heat capacity in J K-1 kg-1 [only used if force_cpp = T]
cpp            = 14000.
# Molecular mass in g mol-1 [only used if force_cpp = T]
mugaz          = 2.14

## Star type
## ~~~~~~~~~
startype = 1
# ~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~
# The choices are:
#
#	startype = 1		Sol        (G2V-class main sequence)
#	startype = 2		Ad Leo     (M-class, synthetic)
#       startype = 3            GJ644
#       startype = 4            HD128167
# ~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~
# Stellar flux at 1 AU. Examples:
# 1366.0 W m-2		Sol today
# 1024.5 W m-2		Sol today x 0.75 = weak early Sun
# 18.462 W m-2		The feeble Gl581
# 19.960 W m-2		Gl581 with e=0.38 orbital average
Fat1AU = 1366.0

## Tracer and aerosol options 
## ~~~~~~~~~~~~~~~~~~~~~~~~~~
# Gravitational sedimentation of tracers (just H2O ice for now) ?
sedimentation = .false.

## Other physics options
## ~~~~~~~~~~~~~~~~~~~~~
# call turbulent vertical diffusion ?
calldifv = .true. 
# use turbdiff instead of vdifc ?
UseTurbDiff = .true.
# call convective adjustment ?
calladj  = .true.
# call thermal conduction in the soil ?
callsoil = .false.
# Internal heat flux (matters only if callsoil=F)
intheat = 2.0
# Remove lower boundary (e.g. for gas giant sims)
nosurf = .true.

#########################################################################
## extra non-standard definitions for Earth
#########################################################################
 
## Tracer and aerosol options 
## ~~~~~~~~~~~~~~~~~~~~~~~~~~
# Radiatively active CO2 aerosol?
aeroco2       = .false.
# Fixed CO2 aerosol distribution?
aerofixco2    = .false.
# Radiatively active water aerosol?
aeroh2o       = .false.
# Fixed water aerosol distribution?
aerofixh2o    = .false.
# basic dust opacity
dusttau       = 0.0
# Varying H2O cloud fraction?
CLFvarying    = .false.
# H2O cloud fraction if fixed?
CLFfixval     = 0.0
# fixed radii for cloud particles?
radfixed=.false.
# number mixing ratio of CO2 ice particles
Nmix_co2      = 100000.
# number mixing ratio of water particles (for rafixed=.false.)
Nmix_h2o      = 1.e7
# number mixing ratio of water ice particles (for rafixed=.false.)
Nmix_h2o_ice  = 5.e5
# radius of H2O water particles (for rafixed=.true.):
rad_h2o=10.e-6
# radius of H2O ice particles (for rafixed=.true.):
rad_h2o_ice=35.e-6
# atm mass update due to tracer evaporation/condensation?
mass_redistrib = .false.

## Water options 
## ~~~~~~~~~~~~~
# Model water cycle
water         = .false.
# Model water cloud formation
watercond     = .false.
# Model water precipitation (including coagulation etc.)
waterrain     = .false.
# Use simple precipitation scheme?
precip_scheme=4
# multiplicative constant in Boucher 95 precip scheme
Cboucher=1.
# Include hydrology ?
hydrology     = .false.
# H2O snow (and ice) albedo ?
albedosnow    = 0.6
# Maximum sea ice thickness ?
maxicethick   = 10.
# Freezing point of seawater (degrees C) ?
Tsaldiff      = 0.0
# Evolve surface water sources ?
sourceevol    = .false.

## CO2 options 
## ~~~~~~~~~~~
# call CO2 condensation ?
co2cond       = .false.
# Set initial temperature profile to 1 K above CO2 condensation everywhere?
nearco2cond   = .false.
