##############################################################################
# PARAMETRES ET CLES DE CONFIGURATION LMDZ
##############################################################################
# D: Valeur par default
#
# Controle des sorties
#*********************
OK_journe=y
OK_mensuel=y
ok_hf=n
OK_instan=n
#ok_regdyn : y/n calcul/non des regymes dynamiques sur regions pre-definies
ok_regdyn=n
# - ok_histNMC = y/n, y/n, y/n pour avoir les sorties NMC mensuelles, journalieres et haute frequence
ok_histNMC = n, n, n
#lev_histdayNMC: nombre de niveaux sur la verticale dans le fichier
#                histdayNMC: 8 ou 17
lev_histdayNMC=8
# A transformer en la ligne ci-dessous quand ce sera compatible avec libIGCM
phys_out_regfkey=n       n       n       n       n      n
phys_out_filekeys=         y       y       n       n       n      n    
phys_out_filenames=      histmth histday histhf  histhf2h histLES histstn
phys_out_filelevels=     5      1       0       0       0
phys_out_filetypes=      ave(X)  ave(X)  ave(X) ave(X) ave(X) inst(X)
phys_out_filetimesteps= 30day 1day 6hr 2hr 6hr 6hr

flag_flat = 1, 1, 0, 0, 0
#
#Couplage avec autres modules
#******************************
#option de couplage pour ocean (D:force)
type_ocean=force
version_ocean=nemo
#avec ou sans orchidee (D:n)
VEGET=y
#type_run=AMIP, ENSP, clim (D:AMIP)
type_run=CLIM
##  Soil Model  ou non               
soil_model=y

#Code de transfert radiatif
#**************************
# ajout de ce flag pour activer/desactiver le rayonnement (MPL)
# 0 : pas de rayonnement. 1: on active le rayonnement (D=1)
iflag_radia=1
## Nombre appels des routines de rayonnements ( par jour)                 
nbapp_rad=16

# Parametres "orbitaux/ ere geologique"
#######################################
#Parametres orbitaux
#excentricite
### R_ecc =      Excentricite
R_ecc = 0.016715
### R_peri =     Equinoxe
R_peri = 102.7
### R_incl =     Inclinaison
R_incl = 23.441
### solaire =    Constante solaire
solaire = 1361.20
### constante solaire lue dans un fichier par defaut
ok_suntime_rrtm=n





##  Facteur additif pour l albedo
pmagic=0.008
#
# Taux gaz a effet de serre
#######################################
#concentration des gaz (co2 ch4   n2o  cfc11 cfc12)
#                  (D: 348. 1650. 306.  280.  484.)
### co2_ppm =    taux CO2 en ppm
co2_ppm = 0.36886500E+03
### CH4_ppb =    taux CH4 en ppb
CH4_ppb = 0.17510225E+04
### N2O_ppb =    taux N2O en ppb
N2O_ppb = 0.31585000E+03
### CFC11_ppt =  taux CFC11eq CMIP6 en ppt
CFC11_ppt = 6.3990e+01
### CFC12_ppt =  taux CFC12eq CMIP6  en ppt
CFC12_ppt = 1.0511e+03

#
# Parametres effets directs/indirects des "aerosols"
#######################################
### ok_alw 	flag for aerosol LW effect
ok_alw=y
ok_cdnc=y
### ok_ade=y/n   flag Aerosol direct effect
ok_ade=y
### ok_aie=y/n   flag Aerosol indirect effect
ok_aie=y
### aer_type =   Aerosol variation type : actuel / preind / scenario / annuel
aer_type=actuel
###  type of coupled aerosol =1 (default) =2 => bc  only =3 => pom only =4 => seasalt only =5 => dust only =6 => all aerosol
flag_aerosol=6
flag_aerosol_strat=0
#
# Parametre de lecture de l'ozone
#######################################
# Allowed values are 0, 1 and 2
# 0: do not read an ozone climatology
# 1: read a single ozone climatology that will be used day and night
# 2: read two ozone climatologies, the average day and night climatology and the daylight climatology
read_climoz=0
#
# Parametres simulateur COSP (CFMIP Observational Simulator Package)
#######################################
### ok_cosp=y/n flag simulateur COSP
ok_cosp=n
### freq_COSP = frequence d'appel de COSP en secondes
freq_COSP=10800.
cles_dbze94=n n n
### ok_mensuelCOSP=y/n sortir fichier mensuel COSP histmthCOSP.nc, =n pas de fichier histmthCOSP.nc
ok_mensuelCOSP=y
### ok_journeCOSP=y/n sortir fichier journalier histdayCOSP.nc, =n pas de fichier histdayCOSP.nc
ok_journeCOSP=n
### ok_hfCOSP=y/n, ecrire sorties  haute frequence histhfCOSP.nc, =n pas de fichier histhfCOSP.nc
ok_hfCOSP=n
#
# Parametres simulateur ISCCP
#######################################
### ok_isccp=y/n flag simulateur ISCCP
ok_isccp=n
### top_height = flag choix calcul nuages par le simulateur en utilisant 
# -              les donnees IR et/ou VIS et l algorithme ISCCP-D1
# - top_height = 1 -> algo IR-VIS
# - top_height = 2 -> identique a 1, mais "ptop(ibox)=pfull(ilev)"
# - top_height = 3 -> algo IR
top_height = 1
### overlap =    Hypothese de Recouvrement (HR) utilisee pour le simulateur ISCCP
# - overlap=1    Max overlap
# - overlap=2    Random overlap
# - overlap=3    Max/Random overlap
overlap = 3
#

# Specifique aquaplanete
########################

ok_all_xml=n
#qsol0=100.
flag_bils=-1 -1 12 13 14
flag_cldh=-1 -1 12 13 14
flag_cldl=-1 -1 12 13 14
flag_cldm=-1 -1 12 13 14
flag_cldq=10 -1 12 13 14
flag_cldt=-1 -1 12 13 14
flag_evap=10 -1 12 13 14
flag_flat=-1 -1 12 13 14
flag_geop=-1 11 12 13 14
flag_LWdnSFC=-1 11 12 13 14
flag_LWdnSFCclr=-1 11 12 13 14
flag_LWupSFC=-1 11 12 13 14
flag_max=10 -1 12 13 14
flag_min=10 -1 12 13 14
flag_ovap=-1 11 12 13 14
flag_phis=-1 11 12 13 14
flag_pluc=10 -1 -1 13 14
flag_plul=10 -1 -1 13 14
flag_pourc_lic=-1 11 12 13 14
flag_pourc_oce=-1 11 12 13 14
flag_pourc_sic=-1 11 12 13 14
flag_pourc_ter=-1 11 12 13 14
flag_precip=-1 -1 12 13 14
flag_pr_lsc_i=-1 11 12 13 14
flag_pr_lsc_l=-1 11 12 13 14
flag_prw=-1 -1 12 13 14
flag_psol=10 -1 12 13 14
flag_q2m=-1 -1 12 13 14
flag_q700=10 -1 12 13 14
flag_rh2m=-1 11 12 13 14
flag_rhum=-1 11 12 13 14
flag_sens=-1 -1 12 13 14
flag_sicf=10 -1 12 13 14
flag_slp=-1 -1 12 13 14
flag_snow=-1 11 12 13 14
flag_soll=-1 -1 12 13 14
flag_soll0=-1 -1 12 13 14
flag_sols=-1 -1 12 13 14
flag_sols0=-1 -1 12 13 14
flag_SWdnSFC=-1 -1 12 13 14
flag_SWdnSFCclr=-1 -1 12 13 14
flag_SWdnTOA=-1 11 12 13 14
flag_SWupSFC=-1 11 12 13 14
flag_SWupSFCclr=-1 11 12 13 14
flag_SWupTOA=-1 11 12 13 14
flag_SWupTOAclr=-1 11 12 13 14
flag_t2m=-1 -1 -1 13 14
flag_t700=10 -1 12 13 14
flag_taux_oce=-1 11 12 13 14
flag_tauy_oce=-1 11 12 13 14
flag_temp=-1 11 12 13 14
flag_topl=-1 -1 -1 13 14
flag_topl0=-1 -1 -1 13 14
flag_tops=-1 -1 12 13 14
flag_tops0=-1 -1 12 13 14
flag_tsol=-1 -1 12 13 14
flag_tsol_oce=-1 -1 12 13 14
flag_u10m=10 -1 12 13 14
flag_u700=10 -1 12 13 14
flag_u850=10 -1 12 13 14
flag_v10m=10 -1 12 13 14
flag_v700=10 -1 12 13 14
flag_vitu=-1 11 12 13 14
flag_vitv=-1 11 12 13 14
flag_vitw=-1 11 12 13 14
flag_w500=-1 11 12 13 14
flag_w700=10 -1 12 13 14
flag_wind10m=-1 11 12 13 14
flag_wind10max=-1 11 12 13 14
flag_z500=-1 11 12 13 14
flag_wake_dens=-1 -1 12 13 14
flag_wake_deltat=-1 -1 12 13 14
flag_wake_deltaq=-1 -1 12 13 14
flag_cv_gen=-1 -1 12 13 14
flag_ale_bl_stat=-1 -1 12 13 14
flag_ale_wk=-1 -1 12 13 14
flag_ale=-1 -1 12 13 14
flag_alp_bl=-1 -1 12 13 14
flag_alp_wk=-1 -1 12 13 14
flag_alp=-1 -1 12 13 14
### XIOS outputs
ok_all_xml=n
