vert_sampling=strato_custom
vert_dzmin=0.017
vert_dzlow=1.2
vert_z0low=8.4
vert_dzmid=9.
vert_z0mid=60.
vert_h_mid=20.
vert_dzhig=10.
vert_z0hig=75.
vert_h_hig=20.
