#
# $Header$
#

OCEAN=force 
VEGET=n
OK_journe=y
OK_mensuel=y
OK_instan=y
if_ebil=0
#
# parametres KE
#
epmax = .99
ok_adj_ema = n
iflag_clw = 1
# 
# parametres nuages
#
cld_lc_lsc = 0.00026
cld_lc_con = 0.00026
cld_tau_lsc = 3600.
cld_tau_con = 3600.
ffallv_lsc = 1.
ffallv_con = 1.
coef_eva = 0.00002
reevap_ice = y
iflag_cldcon = 3
iflag_pdf = 1
fact_cldcon = 1.
#facttemps = 1.e-4
facttemps = 0.0001
ok_newmicro = y
ratqsbas = 0.005
ratqshaut = 0.33
rad_froid = 35
rad_chau1=12
rad_chau2=11
#ksta_ter=1.e-7
ksta_ter=0.0000001
#
# parametres outputs
#
#niveau de sortie "hf" lev_histhf avec
# - lev_histhf=3 => defaut
# - lev_histhf=4 => histhf3d.nc champs 3d niveaux modele
lev_histhf=3
#niveau de sortie "day" lev_histday
# - lev_histday=2 => defaut
# - lev_histday=3 => + champs 3D => F. Lott
# - lev_histday=4 => + champs sous-surfaces
lev_histday=2
#niveau de sortie "mth" lev_histmth avec
# - lev_histmth=2 => defaut
# - lev_histmth=3 => albedo, rugosite sous-surfaces
# - lev_histmth=4 => champs tendances 3d
lev_histmth=2
#
# parametres climatique
#
R_ecc = 0.016715
R_peri = 102.7
R_incl = 23.441
solaire = 1365.
co2_ppm = 348.
CH4_ppb = 1650.
N2O_ppb = 306.
CFC11_ppt = 280.
CFC12_ppt = 484.
#
# parametres simulateur ISCCP
#
top_height = 3
#overlap = 1, 2 ou 3
overlap = 3
#cdmmax
#cdmmax = 2.5E-3
cdmmax = 0.0025
#cdhmax
#cdhmax = 2.0E-3
cdhmax = 0.002
iflag_pbl = 1
iflag_thermals = 0
